--
-- MULTI_MX_REPARTITION_W2_UDT
--

\c - - - :worker_2_port
SET client_min_messages = LOG;
-- Query that should result in a repartition join on UDT column.
SET citus.max_adaptive_executor_pool_size TO 1;
SET citus.enable_repartition_joins to ON;
SET citus.log_multi_join_order = true;

-- Query that should result in a repartition
-- join on int column, and be empty.
SELECT * FROM repartition_udt JOIN repartition_udt_other
    ON repartition_udt.pk = repartition_udt_other.pk;

SELECT * FROM repartition_udt JOIN repartition_udt_other
    ON repartition_udt.udtcol = repartition_udt_other.udtcol
	WHERE repartition_udt.pk > 1
	ORDER BY repartition_udt.pk;
