-- citus--9.5-1--10.0-1

DROP FUNCTION pg_catalog.upgrade_to_reference_table(regclass);
DROP FUNCTION IF EXISTS pg_catalog.citus_total_relation_size(regclass);

#include "udfs/citus_total_relation_size/10.0-1.sql"
#include "udfs/citus_tables/10.0-1.sql"
#include "udfs/citus_finish_pg_upgrade/10.0-1.sql"
#include "udfs/citus_unique_id/10.0-1.sql"

#include "../../columnar/sql/columnar--9.5-1--10.0-1.sql"

CREATE SCHEMA cimv_internal;
GRANT ALL ON SCHEMA cimv_internal to public;